cms y 5- 4- 3- 2- 1- 0 1 2 3 4

b)μ (y /d

from B

ψJ/σd

0 20 40 60 80 100 120 140 160 180 200 220 240 = 5.02 TeV NNs p-Pb

ALICE extr. unc.

ALICE LHCb FONLL + EPPS16 EPPS16 unc.